= Tempo settings dialog

This dialog opens when right-clicking the xref:user-interface/toolbar.adoc#toolbar-metronome[] button in the title bar.
It lets you adjust various tempo-related settings.

NOTE: The settings in here are not global!
They are saved as part of the matrix and therefore together with the REAPER project.

image::generated/screenshots/main/tempo-settings.png[]

include::partial$generated/elements/tempo-settings/click-and-tap.adoc[]
include::partial$generated/elements/tempo-settings/click-volume.adoc[]
include::partial$generated/elements/tempo-settings/tap-volume.adoc[]
include::partial$generated/elements/tempo-settings/count-in.adoc[]