= User interface

This section describes all user interface elements in Helgobox that are relevant to ReaLearn.

The majority of this section focuses on the xref:helgobox::plug-in/user-interface.adoc[native plug-in user interface], as this is where the majority of ReaLearn's functionality is located.

For details on source- or target-specific elements, refer to xref:sources.adoc[] and xref:targets.adoc[].